<template>
  <div class="container-fluid py-4">
    <div class="row mb-4">
      <slot name="button-return" />
    </div>
    <div class="row">
      <div class="col-lg-3">
        <slot name="thanatopractitioner-detail-sidebar" />
        <slot name="file-input" />
      </div>
      <div class="col-lg-9 mt-lg-0 mt-4">
        <slot name="thanatopractitioner-detail-content" />
      </div>
    </div>
  </div>
</template>

<script setup>
// Template only component
</script>
