create table oc_gestion_provider (
	id INT PRIMARY KEY AUTO_INCREMENT,
	provider_name VARCHAR(255) DEFAULT '',
	provider_last_name VARCHAR(255) DEFAULT '',
	provider_company_name VARCHAR(255) DEFAULT '',
	provider_siret_number VARCHAR(255) DEFAULT '',
	provider_phone VARCHAR(255) DEFAULT '',
	provider_email VARCHAR(255) DEFAULT '',
	provider_address VARCHAR(255) DEFAULT '',
	provider_city VARCHAR(255) DEFAULT '',
	id_nextcloud VARCHAR(255) DEFAULT ''
);

alter table oc_gestion_orders 
add column fk_provider_id INT DEFAULT NULL;